Gateway DevelopmentKEK Epics MeetingMay, 2000Ron Chestnut

PEP-II / BaBar Data Paths

Private NetBICBIPBaBarControlSystemHardwareDualGatewaySLC ControlSystemEpics GatewayRouterBIP Gateway

Injection handshake, important beam parametersPoorer QOS

All data comethrough BIP

BIC Gateway

Need for Pattern Matching¥Avoid duplicate name resolution¥Add gateway and hide original PV names¥Modify names to fit other systemrequirements¥Reduce name lookup overhead¥Simplify name translation tablemaintenance

Gateway Improvements¥Together with BESSY¥SLAC added single wildcard¥BESSY enhanced to general pattern match¥More robust